% ----------------------------------------------------------------------------
%
% Changes:    <By whom>, <When>, <What changes> 
%
%      Harald Wabnig, 30.11.1991, created
%      Harald Wabnig, 20. 1.1992, adapted to new grp-form
%      Harald Wabnig, 19. 3.1992, group-form included
%	H. Wabnig, 1.3.'93, adapted to new hardware
%
%  Subpart of the ACPC-Manual.
%  Each group should create a file like this and include it via \input{..}
%  in the acpc-manual.tex file.
%  This file is a description of the facilities of a group.
%  The overall structure of this file is:
%     Forall computers :
%       * Hardware form
%       * Forall software products : Software form
%  It is recommended to make separate files for the description of the
%  hardware and of each software product. Such a file is obtained by filling
%  in the hardware or software form.
%  This file should be put in the subdirectory of the group (only
%  the group-frame must be put in the top level directory).
%  NOTE: This is no independent LaTex file. It has to be included into the
%        ACPC Manual or in a `frame' LaTex file (see `grp-frame.tex') where
%        formating information etc is given.
% REMARK (due to 1st change):
%  In contrast to the sw-form and the hw-form this file should NOT be
%  located in the subdir of the group but in the same dir as the 
%  ACPC  Manual!    Otherwise  the pathes of the files that are `\input'ed 
%  in the group description file are not correct!
%
% ----------------------------------------------------------------------------

\section{Group Description of the Institute for Applied Computer Science and Information Systems, University of Vienna}

% For all computers of a group:
\input{GGH/gGH-group}

% Include the filled in hardware form (it should start with \subsection)
\input{GGH/mc-3de}

% Include the filled in software form (one for each software product)
% (each should start with \subsubsection)
%\input{sw-1}
% ...
%\input{sw-n}
\input{GGH/parix}

