% ----------------------------------------------------------------------------
%
% Changes:    <By whom>, <When>, <What changes> 
%
%      H. Wabnig, 1.3.'93, created
%
%  SW-form for the `MultiTool Transputer Programming Environment' at UNI-Vienna.
%  NOTE: This is no independent LaTex file. It has to be included in the 
%        file that describes the corresponding ACPC group
%        or in a `frame' LaTex file (see `sw-frame.tex') where
%        formating information etc is given.
%        All SW-forms should be included into the group description file
%        after the included HW-form.
%
% ----------------------------------------------------------------------------


\subsubsection*{\bf PARIX}

\begin{itemize}
 \item {\bf Name:} PARIX Release 1.1

 \item {\bf Location:} /home/parix

 \item {\bf Type:} Operating System, C-Compiler

 \item {\bf Characterization:} 
	PARIX is a new operating system for transputer based multiprocessor
	systems. It consists of the basic software to load and run programs,
	software for administration (not included) and ACE EXPERT compilers.

 \item {\bf Functions:} 
       \begin{itemize}
        \item {Example:} \\
	Change to the directory: /home/parix/examples. \\
	Copy the file hello.c to your home directory.\\
	To compile and run the hello.c example type:\\
	\\
	{\tt ancc.px -o foo.px foo.c} \\
	{\tt run -f0 1 1 foo.px} \\
	\\
        There are other examples in the examples directory. For each 
        example exists
	a information file ``doc'' which describes how to compile
	and run the example program.
        \item {Termination:} $<$CTRL$>$ C
        \item {Help:}        Manual pages are available for all PARIX commands. 

       \end{itemize}

 \item {\bf Installation:}  

	For each account a .cshrc file is provided which contains all 
	commands that are necessary to set up the environment.

 \item {\bf Manuals:} 

        ``PARIX Release 1.1. Software Documentation'',
        Parsytec Computer GmbH, D-5100 Aachen, Juelicher Strasse 338, Germany, 
	1992. \\

        ``PARIX Release 1.1. Manual Pages'',
        Parsytec Computer GmbH, D-5100 Aachen, Juelicher Strasse 338, Germany, 
	1992.

\end{itemize}


