% ----------------------------------------------------------------------------
%
%
% Changes:    <By whom>, <When>, <What changes> 
%
%   H. W. Loidl,  31.10.1991, Format info (\documentstyle ... \maketitle)
%                             deleted. Hierarchy of subparts changed.
%   H. W. Loidl,  14. 1.1992, Additional \subsubsection{Software} entered
%                             to separate HW and SW description in the
%                             group description.
%   J. Fritscher, 11. 2.1992, Host computer footprint added.
%   H. W. Loidl,  10. 5.1993, New SW form for SGI
%
%  HW-form for registering the HW-characteristics of each machine in the
%  ACPC network.
%  NOTE: This is no independent LaTeX file. It has to be included in the
%        file that describes the corresponding ACPC group
%        or in a `frame' LaTeX file (see `hw-frame.tex') where
%        formating information etc is given.
%
% ----------------------------------------------------------------------------

\subsection{Silicon Graphics Iris VGX Graphics Supercomputer}              

\subsubsection{Footprint}

\begin{center}
\begin{tabular}{|c|l|}\hline
System               & SGI Iris Power Series                \\ \hline
Architecture         & Shared Memory MIMD                \\ \hline
\# of Processors     & 4                \\ \hline
Type of Processors   & MIPS R3000                \\ \hline
Memory Size          & 64 MB                \\ \hline
Disk Capacity        & 2 GB                \\ \hline
Operating System     & IRIX System V.3                \\ \hline  \hline
Name                 & edelweiss.risc.uni-linz.ac.at                \\ \hline
Internet Address     & 193.170.33.151                \\ \hline
Location             & RISC                \\ \hline
System Administrator & K.\ Erdei ({\tt kerdei})                \\ \hline 
Network Coordinator  & H.\ W.\ Loidl ({\tt hwloidl})                \\ \hline
\end{tabular}
\end{center}


\subsubsection{Availability}

\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}\hline
Group       & RISC & TU-Vienna & Vienna & Linz & Salzburg & World \\ \hline
            & good &   ---     &  ---   & ---  &  ---     &  ---  \\ \hline
\end{tabular}
\end{center}


\subsubsection{Further Description}

The installation of this machine has not been completed, yet. Therefore, there
are currently no ordinary user accounts on the machine and there are also no
guest accounts for the other ACPC groups installed. As soon as this machine
will be opened for general usage, the guest accounts will be installed. This
will be announced over the ACPC mailing list.

\subsubsection{Software}



