% ----------------------------------------------------------------------------
%
%
% Changes:    <By whom>, <When>, <What changes> 
%
%   H. W. Loidl,  31.10.1991, Format info (\documentstyle ... \maketitle)
%                             deleted. Hierarchy of subparts changed.
%   H. W. Loidl,  14. 1.1992, Additional \subsubsection{Software} entered
%                             to separate HW and SW description in the
%                             group description.
%   J. Fritscher, 11. 2.1992, Host computer footprint added.
%
%  HW-form for registering the HW-characteristics of each machine in the
%  ACPC network.
%  NOTE: This is no independent LaTex file. It has to be included in the
%        file that describes the corresponding ACPC group
%        or in a `frame' LaTex file (see `hw-frame.tex') where
%        formating information etc is given.
%
% ----------------------------------------------------------------------------

\subsection{Transputer Network}              

\subsubsection{Footprint}

\begin{center}
\begin{tabular}{|c|l|}\hline
System               & Impuls Transputer Network   \\ \hline
Architecture         & Distributed Memory MIMD     \\ \hline
\# of Processors     & 16                          \\ \hline
Type of Processors   & T800                \\ \hline
Memory Size          & 16 * 4 MB = 64 MB                \\ \hline
Disk Capacity        & 0 MB                \\ \hline
Operating System     & Helios (optionally !)                \\ \hline  \hline
Name                 & ---                \\ \hline
Internet Address     & ---                \\ \hline
Location             & RISC                \\ \hline
System Administrator & K. Siegl ({\tt siegl})                \\ \hline 
Network Coordinator  & H. W. Loidl ({\tt hwloidl})                \\ \hline
\end{tabular}
\end{center}


\subsubsection{Availability}

\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}\hline
Group       & RISC & TU-Vienna & Vienna & Linz & Salzburg & World \\ \hline
            & good &  good     &  slow  & good &  good    & good  \\ \hline
\end{tabular}
\end{center}


\subsubsection{Further Description}

The transputer network is not always turned on. Contact the network 
administrator if you want to work on it.
This transputer network has no fixed topology. Before starting the actual
application the user has to set up a special topology.

% For systems without a special host computer the following footprint
% should be ommited

{\bf Footprint of the Host Computer}

\begin{center}
\begin{tabular}{|c|l|}\hline
System               & AT-PC                 \\ \hline
Type of Processors   & Intel 80386                \\ \hline
Memory Size          & 8 MB               \\ \hline
Disk Capacity        & 100 MB                \\ \hline
Operating System     & Interactive System V R 3.2     \\ \hline  \hline
Name                 & venus.risc.uni-linz.ac.at                \\ \hline
Internet Address     & 193.170.36.70                \\ \hline
Location             & RISC                \\ \hline
System Administrator & W. Schreiner ({\tt schreine})                \\ \hline 
Network Coordinator  & H. W. Loidl ({\tt hwloidl})                \\ \hline
\end{tabular}
\end{center}

\subsubsection{Software}
