% ----------------------------------------------------------------------------
%
%                                  Hans Wolfgang Loidl, RISC-Linz,  4.3.1992 
%
% This is a template file of the `frame' for priniting one HW-form!
%
% Changes:    <By whom>, <When>, <What changes> 
%
% This is a `frame' for printing one (or more) HW-forms without printing
% the whole acpc manual. The idea of this is, that the HW-form itself is
% no complete LaTex file (e.g. it has no format info, no \begin{document}
% and so on) but it contains the information about a machine.
% To include the HW-form properly into the acpc-manual, the HW-form should
% start with \subsection{...}.
%
% ----------------------------------------------------------------------------

\documentstyle[11pt]{article}               % Without Bibliography, in English

% ----------------------------------------------------------------------------
%
% Setting  LaTeX Standard Format
%

% Page Format
\topmargin=0.5cm
\textheight=21.5cm
\footskip=1.5cm
\oddsidemargin=0.75cm
\evensidemargin=0.75cm
\textwidth=14.5cm
\headsep=1cm

% Paragraphs
\parskip=\medskipamount
\parindent=0pt

% Footnote Rule
\renewcommand{\footnoterule} {\kern-3pt \hrule width \textwidth \kern 2.6pt}

% ----------------------------------------------------------------------------
%
% If you want all information on one page I suggest just to use an empty title
% and/or empty authors, since such an output should be for internal use only.
% 
% ----------------------------------------------------------------------------

\title{Form for Hardware Intalled in the ACPC Network}
%\title{}

\author{
  H. W. Loidl, RISC-Linz \\
  H. Wabnig, Institute for Statistics and Computer Science Univ. Vienna\\
  S. Grabner, Institute for Computer Science Univ. Linz \\
  J. Fritscher, Computing Center TU Vienna
}
%\author{}

\begin{document}

\pagestyle{empty}

\maketitle

\input{transp-hw}                         % include the appropriate HW-form here

\input{helios.tex}
\input{lsc.tex}
\input{netconf.tex}
\input{occam.tex}
\input{parascope.tex}
\input{strandpc.tex}

\end{document}

