% ----------------------------------------------------------------------------
%
% This is a template file of the HW-form!
%
% Changes:    <By whom>, <When>, <What changes> 
%
%             Norbert Ulamec, 18.3.92, new
%
%  HW-form for registering the HW-characteristics of each machine in the
%  ACPC network.
%  NOTE: This is no independent LaTex file. It has to be included in the
%        file that describes the corresponding ACPC group
%        or in a `frame' LaTex file (see `hw-frame.tex') where
%        formating information etc is given.
%
% ----------------------------------------------------------------------------

\subsection{CONVEX C220}                  % Insert the name of the machine as headline here

\subsubsection{Footprint}

\begin{center}
\begin{tabular}{|c|l|}\hline
System               &CONVEX C220       \\ \hline
Architecture         &Parallel Vector  \\ \hline
\# of Processors     &2                \\ \hline
Type of Processors   &Vector-processor \\ \hline
Memory Size          &128 MB            \\ \hline
Disk Capacity        &8 GB             \\ \hline
Operating System     &CONVEX OS 9.1    \\ \hline  \hline
Name                 &CONVEX           \\ \hline
Internet Address     &141.201.10.2     \\ \hline
Location             &TECH Consult     \\ \hline
                     &Salzburg         \\ \hline
System Administrator &Kurt Krenn       \\ \hline
Network Coordinator  &Kurt Krenn       \\ \hline
\end{tabular}
\end{center}


\subsubsection{Availability}

\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}\hline
Group       & RISC & TU-Vienna & Vienna & Linz & Salzburg & World \\ \hline
            &      &           &        &      & good     &       \\ \hline
\end{tabular}
\end{center}


\subsubsection{Further Description}



\subsubsection{Software}

