% ----------------------------------------------------------------------------
%
% 				Josef Fritscher, TU-Vienna,  8. 1. 1992
%
% Changes:    <By whom>, <When>, <What changes> 
%
%          J. Fritscher, 12.7.1993, Internet Adress
%
%  HW-form for the Sequent Balance B21 at TU-Vienna.
%  NOTE: This is no independent LaTex file. It has to be included in the
%        file that describes the corresponding ACPC group
%        or in a `frame' LaTex file (see `hw-frame.tex') where
%        formating information etc is given.
%
% ----------------------------------------------------------------------------

\subsection{Sequent Balance B21}

\subsubsection{Footprint}

\begin{center}
\begin{tabular}{|c|l|}\hline
System               & Sequent Balance B21 \\ \hline
Architecture         & Shared Memory MIMD  \\ \hline
\# of Processors     & 28                  \\ \hline
Type of Processors   & NS32032             \\ \hline
Memory Size          & 24 MB               \\ \hline
Disk Capacity        & 540 MB              \\ \hline
Operating System     & DYNIX 3.0.14        \\ \hline  \hline
Name                 & eacpc1.tuwien.ac.at \\ \hline
Internet Address     & 128.130.35.160      \\ \hline
Location             & TU-Vienna           \\ \hline
System Administrator & J.\ Fritscher        \\ \hline
Network Coordinator  & J.\ Fritscher        \\ \hline
\end{tabular}
\end{center}


\subsubsection{Availability}

\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}\hline
Group       & RISC & TU-Vienna & Vienna & Linz & Salzburg & World \\ \hline
            &      &   good    &  good  &      &          & good  \\ \hline
\end{tabular}
\end{center}


\subsubsection{Further Description}

This machine is used for research and educational purpose. 

\subsubsection{Software}
