% ----------------------------------------------------------------------------
%
%                                     Josef Fritscher, TU-Vienna, 12. 3. 1992
%
% Changes:    <By whom>, <When>, <What changes> 
%
%          J. Fritscher, 12.7.1993, Internet addresses
%
%  HW-form for the Intel Hypercube iPSC/860 at TU-Vienna.
%  NOTE: This is no independent LaTex file. It has to be included in the
%        file that describes the corresponding ACPC group
%        or in a `frame' LaTex file (see `hw-frame.tex') where
%        formating information etc is given.
%
% ----------------------------------------------------------------------------

\subsection{Intel Hypercube iPSC/860}

\subsubsection{Footprint}

\begin{center}
\begin{tabular}{|c|l|}\hline
System               & Intel Hypercube iPSC/860               \\ \hline
Architecture         & Distributed Memory MIMD                \\ \hline
\# of Processors     & 16                                     \\ \hline
Type of Processors   & Intel i860                             \\ \hline
Memory Size          & 72 MB                                  \\ \hline
Disk Capacity        & 1.55 GB                                \\ \hline
Operating System     & NX Rel 3.3.1                           \\ \hline \hline
Name                 & eacpc3.tuwien.ac.at                    \\ \hline
Internet Address     & 128.130.35.162                           \\ \hline
Location             & TU-Vienna                              \\ \hline
System Administrator & J.\ Fritscher                          \\ \hline
Network Coordinator  & J.\ Fritscher                          \\ \hline
\end{tabular}
\end{center}


\subsubsection{Availability}

\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}\hline
Group       & RISC & TU-Vienna & Vienna & Linz & Salzburg & World \\ \hline
            &      &   good    &  good  &      &          & good  \\ \hline
\end{tabular}
\end{center}


\subsubsection{Further Description}

% For systems without a special host computer the following footprint
% should be ommited

{\bf Footprint of the Host Computer}

\begin{center}
\begin{tabular}{|c|l|}\hline
System               & Intel PC 386               \\ \hline
Type of Processors   & i386                       \\ \hline
Memory Size          & 8 MB                       \\ \hline
Disk Capacity        & 380 MB                     \\ \hline
Operating System     & AT\&T Unix System V Rel 3.2 \\ \hline  \hline
Name                 & eacpc2.tuwien.ac.at        \\ \hline
Internet Address     & 128.130.35.161             \\ \hline
Location             & TU-Vienna                  \\ \hline
System Administrator & J.\ Fritscher               \\ \hline
Network Coordinator  & J.\ Fritscher               \\ \hline
\end{tabular}
\end{center}

\subsubsection{Software}
