% ----------------------------------------------------------------------------
%
%                                  Josef Fritscher, TU-Vienna, 10.2.1992
%
% Changes:    <By whom>, <When>, <What changes> 
%
%	Josef Fritscher, 27.5.1992, picl.tex added
%       Josef Fritscher, 12.1.1993, p4.tex   added
%
%  Subpart of the ACPC-Manual.
%  Each group should create a file like this and include it via \input{..}
%  in the acpc-manual.tex file.
%  This file is a description of the facilities of a group.
%  The overall structure of this file is:
%     Forall computers :
%       * Hardware form
%       * Forall software products : Software form
%  It is recommended to make separate files for the description of the
%  hardware and of each software product. Such a file is obtained by filling
%  in the hardware or software form.
%  NOTE: This is no independent LaTex file. It has to be included into the
%        ACPC Manual or in a `frame' LaTex file (see `grp-frame.tex') where
%        formating information etc is given.
% REMARK (due to 1st change):
%  In contrast to the sw-form and the hw-form this file should NOT be
%  located in the subdir of the group but in the same dir as the 
%  ACPC  Manual!    Otherwise  the pathes of the files that are `\input'ed 
%  in the group description file are not correct!
%
% ----------------------------------------------------------------------------

\section{Group Description of TU-Vienna}

% For all computers of a group:
\input{TU-Vienna/tuvie-group}

% Include the filled in hardware form (it should start with \subsection)
%\input{group/hw}
\input{TU-Vienna/balance}

% Include the filled in software form (one for each software product)
% (each should start with \subsubsection)
%\input{group/sw-1}
% ...
%\input{group/sw-n}
\input{TU-Vienna/KAP}
\input{TU-Vienna/linda}
\input{TU-Vienna/p4}
\input{TU-Vienna/gcc}
% Another hardware
\input{TU-Vienna/tuintel}
\input{TU-Vienna/lindai}
\input{TU-Vienna/c++}
\input{TU-Vienna/picl}
\input{TU-Vienna/p4}
\input{TU-Vienna/pvm3}
