\chapter{Table of All Available Parallel Machines in the ACPC Network}
\label{table}

This appendix can be seen as a summary of Chapter~\ref{fac} as it
shows all parallel machines in the ACPC Network in just one table.
The information given in this table is sufficient to set up a connection
with any machine in the ACPC Network (even if there is no name service
available). However, if one wants to know details of the machines mentioned
in Table~\ref{machines} one has to look for the corresponding section
in Chapter~\ref{fac}. 

As several machines like the Transputers and the nCube can only be used from
a host machine, for these machines this host is put into Table~\ref{machines}.

\begin{table}[h]

 \begin{tabular}{||l|l|l|l||} \hline \hline
  Group  & Type of Machine & Symbolic Address & Numeric Address \\ \hline \hline
  RISC-Linz & Sequent Symmetry & melmac.risc.uni-linz.ac.at & 193.170.36.100 \\
            & Transputer       & venus.risc.uni-linz.ac.at\footnotemark\ & 193.170.36.70 \\ \hline
  Uni-Vienna & Transputer   & epikur.ani.univie.ac.at\addtocounter{footnote}{-1}\footnotemark & 131.130.32.113  \\ \hline
%  TU-Vienna & Sequent Balance & eacpc1.tuwien.ac.at & 128.130.36.3 \\ 
  TU-Vienna & Intel Hypercube & eacpc2.tuwien.ac.at\addtocounter{footnote}{-1}\footnotemark & 128.130.36.4 \\ \hline
  GUP-Linz  & nCube           & nCube.edvz.uni-linz.ac.at\addtocounter{footnote}{-1}\footnotemark & 140.78.3.5 \\
\hline
  Uni-Vienna & Intel Hypercube & pixy.par.univie.ac.at\addtocounter{footnote}{-1}\footnotemark & 131.130.70.33 \\
  (PPS)           & MasPar  & maspar.par.univie.ac.at\addtocounter{footnote}{-1}\footnotemark & 131.130.70.36 \\ 
             & Transputer & merlin.par.univie.ac.at\addtocounter{footnote}{-1}\footnotemark & 131.130.34.65 \\ \hline
  RIST++     & Alpha Cluster & picard.coma.sbg.ac.at & 141.201.65.2 \\ 
  (Salzburg) & Convex        & convex.edvz.sbg.ac.at & 141.201.10.2 \\ \hline
\hline
 \end{tabular}

 \caption{List of All Parallel Machines in the ACPC Network}
 \label{machines}

\end{table}
                    
 \footnotetext{This is the address of the host
 computer that has to be used to get access to the parallel machine.}

 %\addtocounter{footnote}{1}\footnotetext{To access the
 %Convex one first has to log in to this machine and from there it is possible
 %to log in to the Convex (Address: 141.201.10.2).}
  

