\begin{minipage}{14.5cm}

% This file is included in the ACPC Manual

%\pagestyle{empty}
%\hoffset=-2.5mm
%\voffset=-25mm
%\setlength{\parindent}{0pt}
%\setlength{\textwidth}{165mm}
%\setlength{\oddsidemargin}{0mm}
%\setlength{\evensidemargin}{0mm}
%\setlength{\topmargin}{0mm}
%\setlength{\textheight}{210mm}


\vspace{1.0cm}


We must request you to comply with the following guidelines
when using your account on the above mentioned computer system.
 If you do not, we
are obliged to safeguard the interests of other users by 
removing your account.\\

\vspace{0.0cm}

Should your project require substantial machine resources,
special approval must be given. Please indicate this in the
description of your intended research.\\

You will be notified by e-mail when you account is installed.\\

The machine may go down for experimental work or for systems
operations with little notice.\\

The disk is not to be used for backup purposes.\\

%All users will be included on an electronic mailing list 
%for the provision of any information affecting the machine
%and its users. You will be notified of any  major changes 
%to either hardware or software configurations.\\

Due credit will be given in publications reporting on work done
on this machine.
A copy of each such publication will be sent to the system managing site
(according to the ACPC Manual)
unless it is published in the ACPC Technical Report 
series.\\




I agree to abide by the guidelines for use of the system as
set forth above and any further rules on machine usage should
they become necessary. I understand that failure to comply  
with any regulations will result in the removal of my account.\\

\vspace{.0cm}

\noindent
Name: \\

\noindent
Signature:\\

\noindent
Date:\\



\noindent
Group leader: \\

\noindent
Signature:\\
\noindent


\vspace{1cm}

\end{minipage}

