% This is the header file for the ACPC Manual.
% It contains definitions of new commands and such things that should
% not be done in the separate files because then there could arise 
% some redefinitions.

% ----------------------------------------------------------------------------
%
% Setting  LaTeX Standard Format
%

% Page Format
\topmargin=0.5cm
\textheight=21.5cm
\footskip=1.5cm
\oddsidemargin=0.75cm
\evensidemargin=0.75cm
\textwidth=14.4cm
\headsep=1.2cm

% Paragraphs
\parskip=\medskipamount
\parindent=0pt

% Footnote Rule
\renewcommand{\footnoterule} {\kern-3pt \hrule width \textwidth \kern 2.6pt}

% Line used in figures and tables
\newcommand{\horiz}{{\rule{\textwidth}{.5pt}}}

% Strand
\newcommand{\st}{STRAND\raisebox{.4ex}{\underline{\small 88}}}

\newcommand{\stc}{Vectorizing C-Compiler\raisebox{.4ex}{\underline{\small 88}}}

% ----------------------------------------------------------------------------

