%\documentstyle[11pt]{article}              % Without Bibliography
%\documentstyle[11pt,named,ourbib]{report} % With Bibliography


%\title{Test of the Ping table (ACPC Manual)}

%\author{
% Hans Wolfgang Loidl \\ 
%  Parallel Computation Laboratory \\ 
%  RISC-Linz
%}


%\begin{document}

%\pagestyle{headings}

% Contents Pages  

%\maketitle 
%\tableofcontents
%\listoftables
%\listoffigures

%This sheet just shows a test of the outfit of the ``ping-table' for the 
%ACPC Manual.

% --> RISC-Linz:

\begin{table}

\horiz 

\begin{center}
\begin{tabular}{|l|l||r|}  \hline

  & &  \hfill {\it RISC} \hfill \\ \hline \hline

  RISC-Linz    & Sequent Symmetry	  & 5/6/17 (0 \%) \\
               & Transputer    		  & 7/10/12 (0 \%) \\ \hline
  Uni-Vienna   & MC-3/DE Transputer       & 125/306/767 (0 \%) \\ \hline
  TU-Vienna    & Sequent Balance  	  & 113/728/4027 (0 \%) \\
               & Intel Hypercube 	  & 102/482/2864 (0 \%) \\ \hline
  GUP-Linz     & nCube2       		  & 64/67/69 (0 \%) \\ \hline
  Uni-Vienna   & MasPar                   & 143/554/3400 (0 \%) \\
  (PPS)        & Intel Hypercube          & 150/692/4340 (0 \%) \\ 
	       & Transputer               & 99/342/858 (0 \%) \\ \hline
  RIST++ Salzburg       & Convex     		  & --- \\ 
               & Alpha Cluster 	& 107/143/389 (0 \%) \\ \hline
 \end{tabular}
 \end{center}

 \caption{Ping Times of the ACPC Machines from RISC-Linz} 
 \label{ping-risc}

 \horiz

\end{table}

% --> Uni-Vienna:

\begin{table}

\horiz

\begin{center}
\begin{tabular}{|l|l||r|}  \hline

  & & \hfill {\it Uni-Vienna} \hfill \\ \hline \hline

  
  RISC-Linz    & Sequent Symmetry         & 124/320/700 (0 \%) \\
               & Transputer               & 266/961/1444 (0 \%) \\ \hline
  Uni-Vienna   & MC-3/DE Transputer       & local \\ \hline
  TU-Vienna    & Sequent Balance          & 37/54/161 (0 \%) \\
               & Intel Hypercube          & 34/53/231 (0 \%) \\ \hline
  GUP-Linz     & nCube2                   & 332/588/1210 (0 \%) \\ \hline
  Uni-Vienna   & MasPar                   & 77/77/80 (0 \%) \\
  (PPS)        & Intel Hypercube          & 80/81/98 (0 \%) \\ 
	       & Transputer               & 30/30/35 (0 \%) \\ \hline
  RIST++ Salzburg      & Convex                   & --- \\ 
               & Alpha Cluster  	  & 121/791/4979 (43 \%) \\ \hline
 \end{tabular}
 \end{center}
  
 \caption{Ping Times of the ACPC Machines from the University of Vienna} 
 \label{ping-univie}

 \horiz

\end{table}

% --> TU-Vienna:

\begin{table}

\horiz

\begin{center}
\begin{tabular}{|l|l||r|}  \hline

  & & \hfill {\it TU-Vienna} \hfill \\ \hline \hline

  
  RISC-Linz    & Sequent Symmetry         & 100/407/1421 \\
               & Transputer               & --- \\ \hline
  Uni-Vienna   & MC-3/DE  Transputer      & 29/30/42 \\ \hline
  TU-Vienna    & Sequent Balance          & 7/10/14 \\
               & Intel Hypercube          & 3/3/5 \\ \hline
  GUP-Linz     & nCube2                   & 50/1258/5364 \\ \hline
  Uni-Vienna   & MasPar 		  & 48/58/139 \\
  (PPS)        & Intel Hypercube          & --- \\ \hline
  RIST++ Salzburg     & Convex                   & --- \\
               & Alpha Cluster            & --- \\ \hline
 \end{tabular}
 \end{center}

 \caption{Ping Times of the ACPC Machines from the TU-Vienna} 
 \label{ping-tuvie}

%\horiz
%
%\begin{center}
%\begin{tabular}{|l|l||r|}  \hline
%
%  & & \hfill {\it TU-Vienna} \hfill \\ \hline \hline
%
%  
%  RISC         & Sequent Symmetry         & 189/209/291 \\
%               & Transputer               &  \\ \hline
%  Uni-Vienna   & MC-3/DE  Transputer      & 31/33/51 \\ \hline
%  TU-Vienna    & Sequent Balance          & 8/11/19 \\
%               & Intel Hypercube          & 3/4/13  \\ \hline
%  GUP          & nCube2                   & 133/187/264  \\ \hline
%  PPS          & MasPar                   & --- \\
%               & Intel Hypercube          & --- \\ \hline
%  Uni-Salzburg & Convex                   & --- \\
%               & Alpha Cluster            & --- \\ \hline
% \end{tabular}
% \end{center}
%
% \caption{Ping Times of the ACPC Machines from the TU-Vienna} 
% \label{ping-tuvie}

 \horiz

\end{table}

% --> GUP-Linz:

\begin{table}

\horiz

\begin{center}
\begin{tabular}{|l|l||r|}  \hline

  & & \hfill {\it GUP-Linz} \hfill \\ \hline \hline

  RISC-Linz       & Sequent Symmetry     &  62/112/685 \\
                  & Transputer           &  61/84/206  \\ \hline
  Uni-Vienna      & MC-3/DE Transputer   &  83/952/6389 (7 \% loss) \\ \hline
  TU-Vienna       & Sequent Balance      &  109/305/1956 \\
                  & Intel Hypercube      &  60/199/619 \\ \hline
  GUP-Linz        & nCube2               &  1/1/2      \\ \hline
  Uni-Vienna      & MasPar               &  121/504/1234  \\
  (PPS)           & Intel Hypercube      &  116/600/1843  \\
                  & Transputer           &  55/125/251    \\ \hline
  RIST++ Salzburg          & Convex               &  --- \\ 
                  & Alpha Cluster        &  --- \\ \hline
%  RISC         & Sequent Symmetry         & 64/69/101 \\
%               & Transputer               & 63/223/1150 \\ \hline
%  Uni-Vienna   & MC-3/DE Transputer       & 74/97/275 \\ \hline
%  TU-Vienna    & Sequent Balance          & 189/213/295 \\
%               & Intel Hypercube          & 185/204/302  \\ \hline
%  GUP          & nCube2                   & 2/2/4  \\ \hline
%  PPS          & MasPar                   & 91/95/113 \\
%               & Intel Hypercube          & 94/114/251 \\ \hline
%  Uni-Salzburg & Convex                   & --- \\
%               & Alpha Cluster            & --- \\ \hline
 \end{tabular}
 \end{center}

 \caption{Ping Times of the ACPC Machines from GUP-Linz} 
 \label{ping-gup}

 \horiz

\end{table}

% --> Salzburg:

 \begin{table}

 \horiz
 
 \begin{center}
 \begin{tabular}{|l|l|r|}  \hline
 
   & & \hfill {\it Uni-Salzburg} \hfill \\ \hline \hline
 
    
   RISC-Linz    & Sequent Symmetry   & 103/158/150 (0 \%)\\
                & Transputer         & --- \\ \hline
   Uni-Vienna   & MC-3/DE Transputer & --- \\ \hline 
   TU-Vienna    & Sequent Balance    & 101/322/691 (0 \%)\\
                & Intel Hypercube    & 84/269/609 (0 \%)\\ \hline
   GUP-Linz     & nCube2             & 43/121/366 (0 \%)\\ \hline
   Uni-Vienna   & MasPar             & --- \\
   (PPS)        & Intel Hypercube    & 120/462/1019 (0 \%)\\ \hline
   RIST++ Salzburg & Convex  & 0/0/0 (0 \%)\\
                & Alpha Cluster      & 0/0/0 (0 \%)\\ \hline
  \end{tabular}
  \end{center}
 
  \caption{Ping Times of the ACPC Machines from the University of Salzburg} 
  \label{ping-unisalz}
 
  \horiz

 \end{table}

% -----------------------------------------------------------------------------
%Table \ref{ping} shows a table of data transfer times that were yielded by 
%the UNIX command ping with 16 packets sent each time (Packetsize: 64 Bytes).

%\end{document}

